01234567891024.0

22:58:20.0

16.0

12.0

30.0

03:00.0

1:02:00.0

01:00.0

00:30.0

RA (J2000)

Dec (J2000)

OBSID 01250617000 / DATE-OBS 2024-08-25T15:58:39.3

UVOT Finding Chart