0246810121434.0

15:05:30.0

26.0

22.0

18.0

30.0

55:00.0

28:54:00.0

53:00.0

52:00.0

RA (J2000)

Dec (J2000)

OBSID 01248132000 / DATE-OBS 2024-08-11T14:09:49.6

UVOT Finding Chart