010203040506019:58:50.0

46.0

42.0

51:00.0

30.0

-14:52:00.0

53:00.0

54:00.0

RA (J2000)

Dec (J2000)

OBSID 01223470000 / DATE-OBS 2024-04-21T09:57:59.6

UVOT Finding Chart