0246810121421:43:40.0

36.0

32.0

30.0

15:00.0

4:14:00.0

13:00.0

RA (J2000)

Dec (J2000)

OBSID 01223072000 / DATE-OBS 2024-04-19T12:28:42.3

UVOT Finding Chart