-15-10-505101552.0

48.0

44.0

16:08:40.0

22:00.0

30.0

23:00.0

-15:24:00.0

25:00.0

RA (J2000)

Dec (J2000)

OBSID 01220161000 / DATE-OBS 2024-03-15T09:54:08.2

UVOT Finding Chart