-12-10-8-6-4-20246804.0

16:15:00.0

56.0

14:52.0

35:00.0

30.0

-15:36:00.0

37:00.0

38:00.0

RA (J2000)

Dec (J2000)

OBSID 01220157000 / DATE-OBS 2024-03-15T09:33:41.4

UVOT Finding Chart