024681012141618202218.0

14.0

5:28:10.0

06.0

30.0

21:50:00.0

49:00.0

48:00.0

47:30.0

RA (J2000)

Dec (J2000)

OBSID 01220094000 / DATE-OBS 2024-03-14T23:05:31.9

UVOT Finding Chart