024681012141654.0

5:43:50.0

46.0

42.0

30.0

47:00.0

21:46:00.0

45:00.0

44:30.0

RA (J2000)

Dec (J2000)

OBSID 01219989000 / DATE-OBS 2024-03-13T22:17:36.9

UVOT Finding Chart