05101520253054.0

16:19:50.0

46.0

42.0

45:30.0

46:00.0

30.0

-15:47:00.0

48:00.0

RA (J2000)

Dec (J2000)

OBSID 01219542000 / DATE-OBS 2024-03-11T10:52:09.4

UVOT Finding Chart