05101520253028.0

24.0

19:54:20.0

16.0

12.0

38:00.0

30.0

35:37:00.0

36:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 01218969000 / DATE-OBS 2024-03-06T12:34:50.2

UVOT Finding Chart