0102030405020.0

10.0

12:27:00.0

55:00.0

30.0

-61:56:00.0

57:00.0

RA (J2000)

Dec (J2000)

OBSID 01218690000 / DATE-OBS 2024-03-05T02:43:35.5

UVOT Finding Chart