05101520253038.0

34.0

5:35:30.0

26.0

30.0

45:00.0

21:44:00.0

43:00.0

42:30.0

RA (J2000)

Dec (J2000)

OBSID 01217736000 / DATE-OBS 2024-02-27T05:57:33.7

UVOT Finding Chart