0510152025303504.0

5:37:00.0

56.0

36:52.0

48:00.0

30.0

21:47:00.0

46:00.0

45:00.0

RA (J2000)

Dec (J2000)

OBSID 01217733000 / DATE-OBS 2024-02-27T05:44:06.7

UVOT Finding Chart