051015202530354045505554.0

19:59:50.0

46.0

42.0

38.0

07:00.0

30.0

35:06:00.0

05:00.0

04:30.0

RA (J2000)

Dec (J2000)

OBSID 01217222000 / DATE-OBS 2024-02-24T21:51:26.3

UVOT Finding Chart