024681012141634.0

16:53:30.0

26.0

22.0

11:00.0

30.0

-12:12:00.0

13:00.0

14:00.0

RA (J2000)

Dec (J2000)

OBSID 01216910000 / DATE-OBS 2024-02-22T23:55:48.9

UVOT Finding Chart