0246810121454.0

16:23:50.0

46.0

42.0

-15:30:00.0

30.0

31:00.0

32:00.0

33:00.0

RA (J2000)

Dec (J2000)

OBSID 01215688000 / DATE-OBS 2024-02-16T17:38:57.2

UVOT Finding Chart