024681024.0

17:14:20.0

16.0

12.0

29:30.0

-29:30:00.0

30.0

31:00.0

32:00.0

RA (J2000)

Dec (J2000)

OBSID 01215687000 / DATE-OBS 2024-02-16T17:31:58.3

UVOT Finding Chart