051015202524.0

5:36:20.0

16.0

12.0

30.0

08:00.0

22:07:00.0

06:00.0

05:30.0

RA (J2000)

Dec (J2000)

OBSID 01212787000 / DATE-OBS 2024-02-03T18:42:18.4

UVOT Finding Chart