05101520253052.0

48.0

44.0

17:02:40.0

36.0

42:00.0

30.0

-37:43:00.0

44:00.0

45:00.0

RA (J2000)

Dec (J2000)

OBSID 01212375000 / DATE-OBS 2024-02-01T13:30:59.5

UVOT Finding Chart