0510152025303506.0

16:21:00.0

20:54.0

37:00.0

30.0

38:00.0

39:00.0

-15:40:00.0

RA (J2000)

Dec (J2000)

OBSID 01209631000 / DATE-OBS 2024-01-19T12:02:23.9

UVOT Finding Chart