0246810121454.0

5:33:50.0

46.0

42.0

30.0

18:00.0

22:17:00.0

16:00.0

15:30.0

RA (J2000)

Dec (J2000)

OBSID 01209406000 / DATE-OBS 2024-01-17T16:53:33.7

UVOT Finding Chart