0102030405060708048.0

44.0

5:34:40.0

36.0

30.0

21:00.0

22:20:00.0

19:00.0

18:30.0

RA (J2000)

Dec (J2000)

OBSID 01209406000 / DATE-OBS 2024-01-17T16:50:54.0

UVOT Finding Chart