0102030405010.0

12:25:00.0

50.0

24:40.0

41:30.0

42:00.0

30.0

-62:43:00.0

44:00.0

RA (J2000)

Dec (J2000)

OBSID 01209398000 / DATE-OBS 2024-01-17T15:45:08.2

UVOT Finding Chart