51015202530354038.0

34.0

18:02:30.0

24:30:00.0

30.0

29:00.0

28:00.0

27:30.0

RA (J2000)

Dec (J2000)

OBSID 01208389000 / DATE-OBS 2024-01-12T17:39:57.8

UVOT Finding Chart