51015202528.0

24.0

23:28:20.0

16.0

39:00.0

30.0

51:38:00.0

37:00.0

RA (J2000)

Dec (J2000)

OBSID 01205744000 / DATE-OBS 2024-01-01T20:28:26.5

UVOT Finding Chart