051015202530354020:01:50.0

20:01:44.0

20:01:38.0

30.0

35:20:00.0

19:00.0

18:00.0

17:00.0

RA (J2000)

Dec (J2000)

OBSID 01205107000 / DATE-OBS 2023-12-28T08:39:50.9

UVOT Finding Chart