024681008.0

04.0

2:39:00.0

56.0

38:52.0

37:00.0

30.0

33:36:00.0

35:00.0

34:00.0

RA (J2000)

Dec (J2000)

OBSID 01202749000 / DATE-OBS 2023-12-16T18:39:26.0

UVOT Finding Chart