01020304050600:39:00.0

38:50.0

30.0

57:40:00.0

39:00.0

38:00.0

37:30.0

RA (J2000)

Dec (J2000)

OBSID 01202522000 / DATE-OBS 2023-12-15T10:33:30.6

UVOT Finding Chart