0123456789101120:23:00.0

45.0

22:30.0

24:30.0

25:00.0

30.0

-72:26:00.0

27:00.0

RA (J2000)

Dec (J2000)

OBSID 01202386000 / DATE-OBS 2023-12-14T20:32:23.2

UVOT Finding Chart