0123456736:00.0

30.0

1:35:00.0

34:30.0

49:00.0

83:48:00.0

47:00.0

46:30.0

RA (J2000)

Dec (J2000)

OBSID 01194500000 / DATE-OBS 2023-11-04T01:53:15.8

UVOT Finding Chart