1.5E-16

1E-16

5E-17

0-5E-17

-1E-16

-1.5E-16

12.0

08.0

04.0

16:20:00.0

25:30.0

26:00.0

30.0

-16:27:00.0

28:00.0

29:00.0

RA (J2000)

Dec (J2000)

OBSID 01192747000 / DATE-OBS 2023-09-26T23:06:11.7

UVOT Finding Chart