010203040506012.0

08.0

04.0

16:20:00.0

25:30.0

26:00.0

30.0

-16:27:00.0

28:00.0

RA (J2000)

Dec (J2000)

OBSID 01192742000 / DATE-OBS 2023-09-26T22:40:38.3

UVOT Finding Chart