01020304050607012.0

08.0

04.0

5:35:00.0

30.0

31:00.0

22:30:00.0

29:00.0

28:30.0

RA (J2000)

Dec (J2000)

OBSID 01192737000 / DATE-OBS 2023-09-26T22:14:45.9

UVOT Finding Chart