0123456738.0

34.0

3:30:30.0

26.0

34:00.0

30.0

-44:35:00.0

36:00.0

RA (J2000)

Dec (J2000)

OBSID 01192492000 / DATE-OBS 2023-09-18T04:02:47.0

UVOT Finding Chart