051015202510:06:50.0

40.0

23:30.0

24:00.0

30.0

-55:25:00.0

26:00.0

RA (J2000)

Dec (J2000)

OBSID 01192489000 / DATE-OBS 2023-09-18T03:26:54.8

UVOT Finding Chart