0102030405060708034.0

16:18:30.0

26.0

22.0

36:00.0

30.0

-16:37:00.0

38:00.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 01192252000 / DATE-OBS 2023-09-16T04:22:23.1

UVOT Finding Chart