01234522.0

18.0

14.0

5:35:10.0

47:00.0

30.0

21:46:00.0

45:00.0

44:00.0

RA (J2000)

Dec (J2000)

OBSID 01191904000 / DATE-OBS 2023-09-13T16:59:32.6

UVOT Finding Chart