01020304050607080901005:35:20.0

16.0

12.0

47:00.0

30.0

46:00.0

21:45:00.0

44:00.0

43:30.0

RA (J2000)

Dec (J2000)

OBSID 01191904000 / DATE-OBS 2023-09-13T16:56:53.1

UVOT Finding Chart