012345678944.0

19:58:40.0

36.0

32.0

28.0

30.0

26:00.0

35:25:00.0

24:00.0

23:30.0

RA (J2000)

Dec (J2000)

OBSID 01191903000 / DATE-OBS 2023-09-13T16:46:51.7

UVOT Finding Chart