01020304050607038.0

34.0

5:35:30.0

26.0

30.0

14:00.0

22:13:00.0

12:00.0

11:30.0

RA (J2000)

Dec (J2000)

OBSID 01187199000 / DATE-OBS 2023-08-25T18:14:26.9

UVOT Finding Chart