02468101214161814.0

5:34:10.0

06.0

02.0

30.0

36:00.0

21:35:00.0

34:00.0

33:30.0

RA (J2000)

Dec (J2000)

OBSID 01186908000 / DATE-OBS 2023-08-24T02:29:54.7

UVOT Finding Chart