01234567819:59:00.0

56.0

52.0

58:48.0

24:00.0

30.0

35:23:00.0

22:00.0

21:30.0

RA (J2000)

Dec (J2000)

OBSID 01186386000 / DATE-OBS 2023-08-21T15:07:07.4

UVOT Finding Chart