010203040506012.0

06.0

13:16:00.0

39:30.0

-33:40:00.0

30.0

41:00.0

42:00.0

RA (J2000)

Dec (J2000)

OBSID 01186295000 / DATE-OBS 2023-08-20T19:40:18.6

UVOT Finding Chart