0246810121416182054.0

13:15:50.0

46.0

42.0

38.0

38:00.0

30.0

39:00.0

-33:40:00.0

41:00.0

RA (J2000)

Dec (J2000)

OBSID 01186294000 / DATE-OBS 2023-08-20T19:34:13.9

UVOT Finding Chart