051015202530354024.0

5:37:20.0

16.0

12.0

01:00.0

30.0

23:00:00.0

59:00.0

22:58:00.0

RA (J2000)

Dec (J2000)

OBSID 01186291000 / DATE-OBS 2023-08-20T19:24:36.6

UVOT Finding Chart