01E-16

2E-16

3E-16

4E-16

5E-16

6E-16

7E-16

8E-16

9E-16

56.0

21:53:50.0

44.0

38.0

53:00.0

30.0

52:00.0

51:00.0

37:50:00.0

RA (J2000)

Dec (J2000)

OBSID 01185673001 / DATE-OBS 2023-08-16T17:52:09.3

UVOT Finding Chart