0246810121406.0

11:08:00.0

54.0

07:48.0

24:00.0

30.0

-51:25:00.0

26:00.0

RA (J2000)

Dec (J2000)

OBSID 01185505001 / DATE-OBS 2023-08-15T17:07:19.0

UVOT Finding Chart