0102030405060708012:19:00.0

50.0

18:40.0

01:30.0

02:00.0

30.0

-58:03:00.0

04:00.0

RA (J2000)

Dec (J2000)

OBSID 01185505000 / DATE-OBS 2023-08-15T10:53:02.9

UVOT Finding Chart