0246810121416182008.0

04.0

22:54:00.0

12:00.0

30.0

11:00.0

28:10:00.0

09:00.0

RA (J2000)

Dec (J2000)

OBSID 01181187000 / DATE-OBS 2023-07-28T02:52:14.9

UVOT Finding Chart