05101520253034.0

16:41:30.0

26.0

22.0

18:00.0

30.0

19:00.0

-5:20:00.0

21:00.0

RA (J2000)

Dec (J2000)

OBSID 01180410000 / DATE-OBS 2023-07-23T12:38:02.9

UVOT Finding Chart